﻿--------------------------------------------------------
--  DDL for Table CFG_EARTHQUAKE_NOTIFY
--------------------------------------------------------

  CREATE TABLE "MIRLE"."CFG_EARTHQUAKE_NOTIFY" 
  (	
	   "ALARM_ID" VARCHAR2(30 CHAR), 
	   "PLANT" NUMBER(4,0), 
	   "GAL_MIN" NUMBER(3,0), 
	   "GAL_MAX" NUMBER(3,0), 
	   "USE_NOTIFY" VARCHAR2(1 CHAR) DEFAULT 'N', 
	   "CREATE_USER" VARCHAR2(30 CHAR), 
	   "CREATE_TIME" TIMESTAMP (6) DEFAULT systimestamp, 
	   "UPDATE_USER" VARCHAR2(30 CHAR), 
	   "UPDATE_TIME" TIMESTAMP (6) DEFAULT systimestamp, 
	   "STATUS" NUMBER(1,0) DEFAULT 0
  ) 
  SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
  NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "SYSTEM" ;

  COMMENT ON COLUMN "MIRLE"."CFG_EARTHQUAKE_NOTIFY"."ALARM_ID" IS '異常編號';
  COMMENT ON COLUMN "MIRLE"."CFG_EARTHQUAKE_NOTIFY"."PLANT" IS '地震等級';
  COMMENT ON COLUMN "MIRLE"."CFG_EARTHQUAKE_NOTIFY"."GAL_MIN" IS '最小加速度';
  COMMENT ON COLUMN "MIRLE"."CFG_EARTHQUAKE_NOTIFY"."GAL_MAX" IS '最大加速度';
  COMMENT ON COLUMN "MIRLE"."CFG_EARTHQUAKE_NOTIFY"."USE_NOTIFY" IS '是否通知(Y/N)';
  COMMENT ON COLUMN "MIRLE"."CFG_EARTHQUAKE_NOTIFY"."CREATE_USER" IS '建立人員';
  COMMENT ON COLUMN "MIRLE"."CFG_EARTHQUAKE_NOTIFY"."CREATE_TIME" IS '建立時間';
  COMMENT ON COLUMN "MIRLE"."CFG_EARTHQUAKE_NOTIFY"."UPDATE_USER" IS '更新人員';
  COMMENT ON COLUMN "MIRLE"."CFG_EARTHQUAKE_NOTIFY"."UPDATE_TIME" IS '更新時間';
  COMMENT ON COLUMN "MIRLE"."CFG_EARTHQUAKE_NOTIFY"."STATUS" IS '資料狀態';

--------------------------------------------------------
--  DDL for Index CFG_EARTHQUAKE_NOTIFY_PK
--------------------------------------------------------

  CREATE UNIQUE INDEX "MIRLE"."CFG_EARTHQUAKE_NOTIFY_PK" ON "MIRLE"."CFG_EARTHQUAKE_NOTIFY" ("ALARM_ID") 
  PCTFREE 10 INITRANS 2 MAXTRANS 255 COMPUTE STATISTICS 
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "SYSTEM" ;

--------------------------------------------------------
--  Constraints for Table CFG_EARTHQUAKE_NOTIFY
--------------------------------------------------------

  ALTER TABLE "MIRLE"."CFG_EARTHQUAKE_NOTIFY" MODIFY ("ALARM_ID" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_EARTHQUAKE_NOTIFY" MODIFY ("PLANT" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_EARTHQUAKE_NOTIFY" MODIFY ("GAL_MIN" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_EARTHQUAKE_NOTIFY" MODIFY ("GAL_MAX" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_EARTHQUAKE_NOTIFY" MODIFY ("USE_NOTIFY" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_EARTHQUAKE_NOTIFY" MODIFY ("CREATE_USER" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_EARTHQUAKE_NOTIFY" MODIFY ("CREATE_TIME" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_EARTHQUAKE_NOTIFY" MODIFY ("UPDATE_USER" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_EARTHQUAKE_NOTIFY" MODIFY ("UPDATE_TIME" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_EARTHQUAKE_NOTIFY" MODIFY ("STATUS" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_EARTHQUAKE_NOTIFY" ADD CONSTRAINT "CFG_EARTHQUAKE_NOTIFY_PK" PRIMARY KEY ("ALARM_ID")
  USING INDEX PCTFREE 10 INITRANS 2 MAXTRANS 255 COMPUTE STATISTICS 
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "SYSTEM"  ENABLE;