﻿--------------------------------------------------------
--  DDL for Table CFG_FUNC
--------------------------------------------------------

  CREATE TABLE "MIRLE"."CFG_FUNC" 
   (	
	   "FUNC_ID" NUMBER(*,0) GENERATED BY DEFAULT ON NULL AS IDENTITY MINVALUE 1 MAXVALUE 9999999999999999999999999999 INCREMENT BY 1 START WITH 1 CACHE 20 NOORDER  NOCYCLE  NOKEEP  NOSCALE, 
	   "FUNC_NAME" VARCHAR2(50 CHAR), 
	   "FUNC_URL" VARCHAR2(64 CHAR), 
	   "PARENT_FUNC_ID" NUMBER(*,0), 
	   "CREATE_USER" VARCHAR2(30 CHAR), 
	   "CREATE_TIME" TIMESTAMP (6) DEFAULT systimestamp, 
	   "UPDATE_USER" VARCHAR2(30 CHAR), 
	   "UPDATE_TIME" TIMESTAMP (6) DEFAULT systimestamp, 
	   "STATUS" NUMBER(1,0) DEFAULT 0
  ) 
  SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
  NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "SYSTEM" ;

  COMMENT ON COLUMN "MIRLE"."CFG_FUNC"."FUNC_ID" IS '功能編號';
  COMMENT ON COLUMN "MIRLE"."CFG_FUNC"."FUNC_NAME" IS '功能名稱';
  COMMENT ON COLUMN "MIRLE"."CFG_FUNC"."FUNC_URL" IS '功能網址';
  COMMENT ON COLUMN "MIRLE"."CFG_FUNC"."PARENT_FUNC_ID" IS '父功能編號';
  COMMENT ON COLUMN "MIRLE"."CFG_FUNC"."CREATE_USER" IS '建立人員';
  COMMENT ON COLUMN "MIRLE"."CFG_FUNC"."CREATE_TIME" IS '建立時間';
  COMMENT ON COLUMN "MIRLE"."CFG_FUNC"."UPDATE_USER" IS '更新人員';
  COMMENT ON COLUMN "MIRLE"."CFG_FUNC"."UPDATE_TIME" IS '更新時間';
  COMMENT ON COLUMN "MIRLE"."CFG_FUNC"."STATUS" IS '資料狀態';

--------------------------------------------------------
--  DDL for Index CFG_FUNC_PK
--------------------------------------------------------

  CREATE UNIQUE INDEX "MIRLE"."CFG_FUNC_PK" ON "MIRLE"."CFG_FUNC" ("FUNC_ID") 
  PCTFREE 10 INITRANS 2 MAXTRANS 255 COMPUTE STATISTICS 
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "SYSTEM" ;

--------------------------------------------------------
--  Constraints for Table CFG_FUNC
--------------------------------------------------------

  ALTER TABLE "MIRLE"."CFG_FUNC" MODIFY ("FUNC_ID" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_FUNC" MODIFY ("FUNC_NAME" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_FUNC" MODIFY ("PARENT_FUNC_ID" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_FUNC" MODIFY ("CREATE_USER" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_FUNC" MODIFY ("CREATE_TIME" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_FUNC" MODIFY ("UPDATE_USER" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_FUNC" MODIFY ("UPDATE_TIME" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_FUNC" MODIFY ("STATUS" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_FUNC" ADD CONSTRAINT "CFG_FUNC_PK" PRIMARY KEY ("FUNC_ID")
  USING INDEX PCTFREE 10 INITRANS 2 MAXTRANS 255 COMPUTE STATISTICS 
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "SYSTEM"  ENABLE;