﻿--------------------------------------------------------
--  DDL for Table CFG_LOC
--------------------------------------------------------

  CREATE TABLE "MIRLE"."CFG_LOC" 
  (	
	   "STORAGE_ID" VARCHAR2(7 CHAR), 
	   "LOC_ID" VARCHAR2(9 CHAR), 
	   "PRODUCT_TYPE" VARCHAR2(10 CHAR), 
	   "ROW_X" VARCHAR2(3 CHAR), 
	   "BAY_Y" VARCHAR2(3 CHAR), 
	   "LEVEL_Z" VARCHAR2(3 CHAR), 
	   "LOC_SIZE" VARCHAR2(1 CHAR) DEFAULT 'G', 
	   "LOC_WEIGHT" NUMBER(5,0), 
	   "LOC_HEIGHT" NUMBER(5,0), 
	   "LOC_DEPTH" NUMBER(5,0), 
	   "LOC_LOADING" NUMBER(6,0), 
	   "REMARKS" VARCHAR2(255 CHAR), 
	   "AXIS_X" NUMBER(6,2) DEFAULT 0.0, 
	   "AXIS_Y" NUMBER(6,2) DEFAULT 0.0, 
	   "CREATE_USER" VARCHAR2(30 CHAR), 
	   "CREATE_TIME" TIMESTAMP (6) DEFAULT systimestamp, 
	   "UPDATE_USER" VARCHAR2(30 CHAR), 
	   "UPDATE_TIME" TIMESTAMP (6) DEFAULT systimestamp, 
	   "STATUS" NUMBER(1,0) DEFAULT 0, 
  ) 
  SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
  NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "SYSTEM" ;

  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."STORAGE_ID" IS '儲存區編號';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."LOC_ID" IS '儲位編號';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."PRODUCT_TYPE" IS '存放的產品類別';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."ROW_X" IS '列';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."BAY_Y" IS '行';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."LEVEL_Z" IS '層';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."LOC_SIZE" IS '儲位尺寸';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."LOC_WEIGHT" IS '儲位寬度(m)';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."LOC_HEIGHT" IS '儲位高度(m)';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."LOC_DEPTH" IS '儲位深度(m)';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."LOC_LOADING" IS '儲位可乘載重量(kg)';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."REMARKS" IS '備註';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."AXIS_X" IS '圖座標 X';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."AXIS_Y" IS '圖座標 Y';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."CREATE_USER" IS '建立人員';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."CREATE_TIME" IS '建立時間';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."UPDATE_USER" IS '更新人員';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."UPDATE_TIME" IS '更新時間';
  COMMENT ON COLUMN "MIRLE"."CFG_LOC"."STATUS" IS '資料狀態';

--------------------------------------------------------
--  DDL for Index CFG_LOC_PK
--------------------------------------------------------

  CREATE UNIQUE INDEX "MIRLE"."CFG_LOC_PK" ON "MIRLE"."CFG_LOC" ("STORAGE_ID", "LOC_ID") 
  PCTFREE 10 INITRANS 2 MAXTRANS 255 COMPUTE STATISTICS 
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "SYSTEM" ;

--------------------------------------------------------
--  Constraints for Table CFG_LOC
--------------------------------------------------------

  ALTER TABLE "MIRLE"."CFG_LOC" MODIFY ("STORAGE_ID" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_LOC" MODIFY ("LOC_ID" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_LOC" MODIFY ("PRODUCT_TYPE" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_LOC" MODIFY ("ROW_X" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_LOC" MODIFY ("BAY_Y" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_LOC" MODIFY ("LEVEL_Z" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_LOC" MODIFY ("CREATE_USER" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_LOC" MODIFY ("CREATE_TIME" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_LOC" MODIFY ("UPDATE_USER" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_LOC" MODIFY ("UPDATE_TIME" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_LOC" MODIFY ("STATUS" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_LOC" ADD CONSTRAINT "CFG_LOC_PK" PRIMARY KEY ("STORAGE_ID", "LOC_ID")
  USING INDEX PCTFREE 10 INITRANS 2 MAXTRANS 255 COMPUTE STATISTICS 
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "SYSTEM"  ENABLE;