﻿--------------------------------------------------------
--  DDL for Table MAP_STORAGE_AND_SHTC
--------------------------------------------------------

  CREATE TABLE "MIRLE"."CFG_PERIPHERAL_EQUIPMENT" 
  (	
    "STORAGE_ID" VARCHAR2(7 CHAR), 
	"STATION_TYPE" NUMBER(1, 0), 
	"PLCC_STATION_ID" VARCHAR2(9 CHAR), 
	"PLCC_SOFTWARE_ID" VARCHAR2(7 CHAR), 
	"SHTC_STATION_ID" VARCHAR2(9 CHAR), 
	"SHTC_SOFTWARE_ID" VARCHAR2(7 CHAR), 
    "AGVC_STATION_ID" VARCHAR2(9 CHAR), 
	"AGVC_SOFTWARE_ID" VARCHAR2(7 CHAR), 
	"STORAGE_LOCK_STATUS" NUMBER(1,0)
   ) 
   SEGMENT CREATION IMMEDIATE 
   PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
   NOCOMPRESS LOGGING
   STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
   PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
   BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
   TABLESPACE "SYSTEM" ;

   COMMENT ON COLUMN "MIRLE"."CFG_PERIPHERAL_EQUIPMENT"."STORAGE_ID" IS '儲存區編號';
   COMMENT ON COLUMN "MIRLE"."CFG_PERIPHERAL_EQUIPMENT"."STATION_TYPE" IS '站點類別';
   COMMENT ON COLUMN "MIRLE"."CFG_PERIPHERAL_EQUIPMENT"."PLCC_STATION_ID" IS 'PLCC 站點編號';
   COMMENT ON COLUMN "MIRLE"."CFG_PERIPHERAL_EQUIPMENT"."PLCC_SOFTWARE_ID" IS 'PLCC 軟體編號';
   COMMENT ON COLUMN "MIRLE"."CFG_PERIPHERAL_EQUIPMENT"."SHTC_STATION_ID" IS 'SHTC 站點編號';
   COMMENT ON COLUMN "MIRLE"."CFG_PERIPHERAL_EQUIPMENT"."SHTC_SOFTWARE_ID" IS 'SHTC 軟體編號';
   COMMENT ON COLUMN "MIRLE"."CFG_PERIPHERAL_EQUIPMENT"."SHTC_STATION_ID" IS 'AGVC 站點編號';
   COMMENT ON COLUMN "MIRLE"."CFG_PERIPHERAL_EQUIPMENT"."SHTC_SOFTWARE_ID" IS 'AGVC 軟體編號';
   COMMENT ON COLUMN "MIRLE"."CFG_PERIPHERAL_EQUIPMENT"."STORAGE_LOCK_STATUS" IS '儲存區鎖定狀態';
--------------------------------------------------------
--  Constraints for Table MAP_STORAGE_AND_SHTC
--------------------------------------------------------

  ALTER TABLE "MIRLE"."CFG_PERIPHERAL_EQUIPMENT" MODIFY ("STORAGE_ID" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_PERIPHERAL_EQUIPMENT" MODIFY ("STATION_TYPE" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_PERIPHERAL_EQUIPMENT" MODIFY ("PLCC_STATION_ID" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_PERIPHERAL_EQUIPMENT" MODIFY ("PLCC_SOFTWARE_ID" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_PERIPHERAL_EQUIPMENT" MODIFY ("STORAGE_LOCK_STATUS" NOT NULL ENABLE);
