﻿--------------------------------------------------------
--  DDL for Table CFG_SOFTWARE
--------------------------------------------------------

  CREATE TABLE "MIRLE"."CFG_SOFTWARE" 
  (	
	   "SOFTWARE_ID" VARCHAR2(7 CHAR), 
	   "SOFTWARE_TYPE" VARCHAR2(3 CHAR), 
	   "SOFTWARE_NAME" VARCHAR2(30 CHAR), 
	   "SOFTWARE_DESC" VARCHAR2(50 CHAR), 
	   "SOFTWARE_ADDRESS" VARCHAR2(15 CHAR), 
	   "SOFTWARE_PORT" NUMBER, 
	   "CREATE_USER" VARCHAR2(30 CHAR), 
	   "CREATE_TIME" TIMESTAMP (6) DEFAULT systimestamp, 
	   "UPDATE_USER" VARCHAR2(30 CHAR), 
	   "UPDATE_TIME" TIMESTAMP (6) DEFAULT systimestamp, 
	   "STATUS" NUMBER(1,0) DEFAULT 0
  ) 
  SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 
  NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "SYSTEM" ;

  COMMENT ON COLUMN "MIRLE"."CFG_SOFTWARE"."SOFTWARE_ID" IS '軟體編號';
  COMMENT ON COLUMN "MIRLE"."CFG_SOFTWARE"."SOFTWARE_TYPE" IS '軟體類別';
  COMMENT ON COLUMN "MIRLE"."CFG_SOFTWARE"."SOFTWARE_NAME" IS '軟體名稱';
  COMMENT ON COLUMN "MIRLE"."CFG_SOFTWARE"."SOFTWARE_DESC" IS '軟體敘述';
  COMMENT ON COLUMN "MIRLE"."CFG_SOFTWARE"."SOFTWARE_ADDRESS" IS '網路位址';
  COMMENT ON COLUMN "MIRLE"."CFG_SOFTWARE"."SOFTWARE_PORT" IS '通訊埠口';
  COMMENT ON COLUMN "MIRLE"."CFG_SOFTWARE"."CREATE_USER" IS '建立人員';
  COMMENT ON COLUMN "MIRLE"."CFG_SOFTWARE"."CREATE_TIME" IS '建立時間';
  COMMENT ON COLUMN "MIRLE"."CFG_SOFTWARE"."UPDATE_USER" IS '更新人員';
  COMMENT ON COLUMN "MIRLE"."CFG_SOFTWARE"."UPDATE_TIME" IS '更新時間';
  COMMENT ON COLUMN "MIRLE"."CFG_SOFTWARE"."STATUS" IS '資料狀態';

--------------------------------------------------------
--  DDL for Index CFG_SOFTWARE_PK
--------------------------------------------------------

  CREATE UNIQUE INDEX "MIRLE"."CFG_SOFTWARE_PK" ON "MIRLE"."CFG_SOFTWARE" ("SOFTWARE_ID") 
  PCTFREE 10 INITRANS 2 MAXTRANS 255 COMPUTE STATISTICS 
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "SYSTEM" ;

--------------------------------------------------------
--  Constraints for Table CFG_SOFTWARE
--------------------------------------------------------

  ALTER TABLE "MIRLE"."CFG_SOFTWARE" MODIFY ("SOFTWARE_ID" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_SOFTWARE" MODIFY ("SOFTWARE_TYPE" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_SOFTWARE" MODIFY ("SOFTWARE_NAME" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_SOFTWARE" MODIFY ("SOFTWARE_ADDRESS" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_SOFTWARE" MODIFY ("SOFTWARE_PORT" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_SOFTWARE" MODIFY ("CREATE_USER" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_SOFTWARE" MODIFY ("CREATE_TIME" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_SOFTWARE" MODIFY ("UPDATE_USER" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_SOFTWARE" MODIFY ("UPDATE_TIME" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_SOFTWARE" MODIFY ("STATUS" NOT NULL ENABLE);
  ALTER TABLE "MIRLE"."CFG_SOFTWARE" ADD CONSTRAINT "CFG_SOFTWARE_PK" PRIMARY KEY ("SOFTWARE_ID")
  USING INDEX PCTFREE 10 INITRANS 2 MAXTRANS 255 COMPUTE STATISTICS 
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "SYSTEM"  ENABLE;